Values of SUGRA

Parameters

Point 1 Point 2 Point 3 Point 4 Point 5 M0 400.0 100.0 200.0 300.0

M1_/2 200.0 300.0 100.0 150.0

A0 0.0 0.0 0.0 200.0 �600.0 tan(β) 2.000 2.000 2.000 10.000 2.000 sign(μ) �1.0 �1.0 �1.0 1.0 Mt 175.0 175.0 175.0 175.0 175.0

α�1_{em} 127.7 127.7 127.8 128.0 127.8

αs 0.131 0.133 0.133 0.120 0.134 sin^2(θ)w 0.231 0.231 0.231 0.232 0.231

μ �100.0

M(eg) 900.0 M(few) 1000.0